; georges_plugin_test.def : Declares the module parameters for the DLL.

LIBRARY      "georges_plugin_test"
DESCRIPTION  'georges_plugin_test Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	IGeorgesEditGetInterface
