; georges_plugin_sound.def : Declares the module parameters for the DLL.

;LIBRARY      "georges_plugin_sound"
;DESCRIPTION  'Sound Plugin for Georges'

EXPORTS
    ; Explicit exports can go here
	IGeorgesEditGetInterface
